<!--
 * @Author: donghao donghao@supervision.ltd
 * @Date: 2025-03-06 15:15:01
 * @LastEditors: donghao donghao@supervision.ltd
 * @LastEditTime: 2025-03-06 15:15:26
 * @FilePath: \vite-ai\data-dashboard\src\views\dashboard\PoleMonitor.vue
 * @Description: 这是默认设置,请设置`customMade`, 打开koroFileHeader查看配置 进行设置: https://github.com/OBKoro1/koro1FileHeader/wiki/%E9%85%8D%E7%BD%AE
-->
<template>
    撑杆监测
</template>